; xref.def : Declares the module parameters for the DLL.

LIBRARY      "xref"
DESCRIPTION  'xref Windows Dynamic Link Library'

EXPORTS
; Explicit exports can go here
XREF_Init                  @2
XREF_GetXref               @3
XREF_DeInit                @4
